Effect of DDC shift upon extrapolator accuracy -- p98 events

1999/11/06 11.28

-5 -4 -3 -2 -1 0 1 2 3 4 5

50 100 150 200 actual TOF hole hit extrapolator accuracy

25k events default wiremap

-5 -4 -3 -2 -1 0 1 2 3 4 5

50 100 150 200 actual TOF hole hit extrapolator accuracy

25k events 6 cm wiremap shift